-500 0 500 -80

-60

-40

-20

0

20

40

60

80

change(gC/m^2) latitude a) biomass

-50 0 50 -80

-60

-40

-20

0

20

40

60

80

change(gC/m^2/y) b) PP

-20 0 20 -80

-60

-40

-20

0

20

40

60

80

change(gC/m^2/y) c) EP